
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█                                                                             █
█                                                                             █
█  Novell's Netware interconnectivity strategy, Open Data-Link                █
█  Interface (ODI) is supported by the EtherLink III family of adapters.      █
█                                                                             █
█  The utility program will install the EtherLink III adapter driver          █
█  on a DOS ODI workstation.  This utility program must be run on all         █
█  DOS ODI workstations where an EtherLink III adapter is installed.          █
█  Depending on how the workstation is started, the AUTOEXEC.BAT or other     █
█  batch file needs to be changed to invoke the new driver.                   █
█                                                                             █
█  This utility program will only run in DOS. The program asks for the        █
█  path, then installs the driver in that path.  The path specified is        █
█  carried in the environment area of DOS.  If the error message "Out         █
█  of enviroment space" appears, reconfigure DOS for a larger environment     █
█  area.                                                                      █
█                                                                             █
█                                                                             █
█                                                                             █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

